-- phpMyAdmin SQL Dump
-- version 2.11.9.5
-- http://www.phpmyadmin.net
--
-- Serveur: odysseus2.silogic.fr
-- Généré le : Mar 21 Juin 2011 à 11:03
-- Version du serveur: 5.1.41
-- Version de PHP: 5.1.6

SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Base de données: `cnes`
--

-- --------------------------------------------------------

--
-- Structure de la table `USER_PROPERTIES`
--

CREATE TABLE IF NOT EXISTS `USER_PROPERTIES` (
  `key` varchar(64) COLLATE utf8_unicode_ci NOT NULL,
  `value` varchar(256) COLLATE utf8_unicode_ci DEFAULT NULL,
  `identifier` varchar(64) COLLATE utf8_unicode_ci DEFAULT NULL,
  `scope` varchar(8) COLLATE utf8_unicode_ci DEFAULT NULL,
  PRIMARY KEY (`key`, `identifier`)
) ENGINE=INNODB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;

--
-- Contenu de la table `USER_PROPERTIES`
--

